vhdl.20 ----- Copyright 1990 University of Pittsburgh

more of the log file

| clock 8 times

| prd=0000000000000000 [0/0x0]=(0)

| cntl=01111111 [127/0x7f]=(127)

| in2=00011100 [28/0x1c]=(28)

| in1=00001100 [12/0xc]=(12)

| acc=0000000000001110 [14/0xe]=(14)

| output_valid=0 load=0 clock=0

| time=6000=600.0ns

| thats 1

cl

dl

| prd=0000000000000000 [0/0x0]=(0)

| cntl=00111111 [63/0x3f]=(63)

| in2=00011100 [28/0x1c]=(28)

| in1=00001100 [12/0xc]=(12)

| acc=0000000000000111 [7/0x7]=(7)

| output_valid=0 load=0 clock=0

| time=9000=900.0ns

| thats 2